From 6b2411d2a6879db0a4bd6b5b7ee10b6a51fe93ec Mon Sep 17 00:00:00 2001
From: Adrian Kummerlaender
Date: Thu, 17 Jan 2019 15:06:39 +0100
Subject: Basic ParaView-generated plot of mass loss

…when using order 2 interpolation in C2F. NOT when using simpler restriction in F2C.
I do not know where I got that idea from.
---
 content.tex | 5 +++++
 1 file changed, 5 insertions(+)

(limited to 'content.tex')

diff --git a/content.tex b/content.tex
index 190cc9e..07c946c 100644
--- a/content.tex
+++ b/content.tex
@@ -799,3 +799,8 @@ Hiermit sind die zentralen Bestandteile der Umsetzung des Verfahrens von Lagrava
 \includegraphics[scale=2.0]{img/refined_poiseuille_1.png}
 \caption{Halbseitig verfeinerte Poiseuille Rohrströmung}
 \end{figure}
+
+\begin{figure}[h]
+\centering
+\includegraphics[scale=0.4]{img/massloss_paraview_plot.png}
+\end{figure}
-- 
cgit v1.2.3

